import BackToTopButton from "../../shared/components/backtotop";
import Approach from "../../shared/components/healthcare/HowItWorksSection";
import Competitions from "../../shared/components/healthcare/BuildForGrowth";
import CustomerInsight from "../../shared/components/healthcare/MassAdoption​Section";
import FirstSection from "../../shared/components/healthcare/FirstSection";
import SectionSection from "../../shared/components/healthcare/SecondSection";
import ProblemsSection from "../../shared/components/healthcare/SecondSection";
import SolutionsOfProduct from "../../shared/components/healthcare/JoinACommunityOfMillions";
import MassAdoptionSection from "../../shared/components/healthcare/MassAdoption​Section";
import HowItWorksSection from "../../shared/components/healthcare/HowItWorksSection";
import BuildForGrowth from "../../shared/components/healthcare/BuildForGrowth";
import JoinACommunityOfMillions from "../../shared/components/healthcare/JoinACommunityOfMillions";

type Props = {};

const Healthcare = (props: Props) => {
  return (
    <div className="flex flex-col">
      <FirstSection />
      <SectionSection />
      <MassAdoptionSection />
      <HowItWorksSection/>
      <BuildForGrowth />
      <JoinACommunityOfMillions />
      <BackToTopButton />
    </div>
  );
};

export default Healthcare;
